00 . 2 0 . 4 0 . 6 0 . 8 1No targetTargetTarget740760780800820840860880900

Intensity (A.U.)00,20,40,60,81740760780800820840860880900No targetTargetTargetTarget

Intensity (A.U.)Wavelength (nm)00,20,40,60,81740760780800820840860880900No targetTargetTarget

Intensity (A.U.)Wavelength (nm)Fig.3